[{"question":"What the pricing and per square ft rate of Guardian Hill Shire  Phase 1?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Guardian Hill Shire  Phase 1\r\n. 1 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 3 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are RERA numbers for the project Guardian Hill Shire  Phase 1?","answer":"RERA numbers for the project Guardian Hill Shire  Phase 1 are: \r\nP52100001572"},{"question":"What are the configurations available in Guardian Hill Shire  Phase 1?","answer":"Guardian Hill Shire  Phase 1 project offers 1 BHK, 2 BHK, 3 BHK configurations."}]