[{"question":"What the pricing and per square ft rate of Veena Sai Nandan?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Veena Sai Nandan\r\n. 1 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are RERA numbers for the project Veena Sai Nandan?","answer":"RERA numbers for the project Veena Sai Nandan are: \r\nP52100034152"},{"question":"What are the configurations available in Veena Sai Nandan?","answer":"Veena Sai Nandan project offers 1 BHK, 2 BHK configurations."}]