[{"question":"What the pricing and per square ft rate of Saubhagya Indrayani Ira?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Saubhagya Indrayani Ira\r\n. 1 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are RERA numbers for the project Saubhagya Indrayani Ira?","answer":"RERA numbers for the project Saubhagya Indrayani Ira are: \r\nP52100014863"},{"question":"What are the configurations available in Saubhagya Indrayani Ira?","answer":"Saubhagya Indrayani Ira project offers 1 BHK, 2 BHK configurations."}]