[{"question":"What the pricing and per square ft rate of Ganesh N B Pearl Phase III?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Ganesh N B Pearl Phase III\r\n. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are the configurations available in Ganesh N B Pearl Phase III?","answer":"Ganesh N B Pearl Phase III project offers 2 BHK configurations."},{"question":"What are RERA numbers for the project Ganesh N B Pearl Phase III?","answer":"RERA numbers for the project Ganesh N B Pearl Phase III are: \r\nP52100015948"}]