[{"question":"What the pricing and per square ft rate of DB Indraprasthanagari Phase 1?","answer":"Following is the pricing range by configuration and per square ft rate for the units in DB Indraprasthanagari Phase 1\r\n. 1 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are the configurations available in DB Indraprasthanagari Phase 1?","answer":"DB Indraprasthanagari Phase 1 project offers 1 BHK, 2 BHK configurations."},{"question":"What are RERA numbers for the project DB Indraprasthanagari Phase 1?","answer":"RERA numbers for the project DB Indraprasthanagari Phase 1 are: \r\nP52100014352"}]