[{"question":"What are RERA numbers for the project Metro Vrundavan B Building?","answer":"RERA numbers for the project Metro Vrundavan B Building are: \r\nP52100052420"},{"question":"What the pricing and per square ft rate of Metro Vrundavan B Building?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Metro Vrundavan B Building\r\n. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 3 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are the configurations available in Metro Vrundavan B Building?","answer":"Metro Vrundavan B Building project offers 2 BHK, 3 BHK configurations."}]