[{"question":"What are the configurations available in Shree Vishwanath Krishna Classic?","answer":"Shree Vishwanath Krishna Classic project offers 1 BHK, 2 BHK configurations."},{"question":"What are RERA numbers for the project Shree Vishwanath Krishna Classic?","answer":"RERA numbers for the project Shree Vishwanath Krishna Classic are: \r\nP52100005965"},{"question":"What the pricing and per square ft rate of Shree Vishwanath Krishna Classic?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Shree Vishwanath Krishna Classic\r\n. 1 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"}]