[{"question":"What are RERA numbers for the project Shubham Florencia Phase 1?","answer":"RERA numbers for the project Shubham Florencia Phase 1 are: \r\nP52100002881"},{"question":"What the pricing and per square ft rate of Shubham Florencia Phase 1?","answer":"Following is the pricing range by configuration and per square ft rate for the units in Shubham Florencia Phase 1\r\n. 2 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft. 3 BHK units have total price range between Rs. null to Rs. null and rate of Rs. null \/ sqft"},{"question":"What are the configurations available in Shubham Florencia Phase 1?","answer":"Shubham Florencia Phase 1 project offers 2 BHK, 3 BHK configurations."}]